-- 回滚：修复设备-SIM卡绑定隐患

-- 删除设备插槽唯一索引
DROP INDEX IF EXISTS idx_active_device_slot;

-- 删除导入任务表的警告字段
ALTER TABLE tb_device_import_task 
DROP COLUMN IF EXISTS warning_count,
DROP COLUMN IF EXISTS warning_items;
